<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% This file cannot be loaded in main-test.tex for it would load the version of crossrefenum.tex
% installed in the texmf tree.
% As a consequence, it should not be changed to correct bugs or implement new features.
\input crossrefenum.tex
\ProvidesPackage{crossrefenum}[\crfnmDate{} v\crfnmVersion{} Enumeration of cross-references]
\endinput</pre></body></html>