<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\documentclass[pagesize=auto, fontsize=14pt, DIV=9, parskip=half]{scrartcl}

\usepackage{fixltx2e}
\usepackage{etex}
\usepackage{lmodern}
\usepackage[T1]{fontenc}
\usepackage{textcomp}
\usepackage{microtype}
\usepackage{hyperref}

\newcommand*{\mail}[1]{\href{mailto:#1}{\texttt{#1}}}
\newcommand*{\pkg}[1]{\textsf{#1}}

\addtokomafont{title}{\rmfamily}

\title{The \pkg{romanneg} package\thanks{This manual corresponds to \pkg{romanneg.sty}~v1.03, dated~15 June 1992.}}
\author{Mario Wolczko\thanks{\mail{mario@acm.org}}}
\date{15 June 1992}


\begin{document}

\maketitle

This style option should not change the appearance of a document,
but merely change the page numbers (as defined by \verb|\count0|) in the
DVI file to be negative when roman pagenumbering is in use.

To do this, the \verb|\@steppagecounter| macro increments the absolute
value of \verb|\count0|

\end{document}
</pre></body></html>